02468101214161832.0

26.0

15:02:20.0

14.0

28:00.0

30.0

47:27:00.0

26:00.0

25:00.0

RA (J2000)

Dec (J2000)

OBSID 01131397000 / DATE-OBS 2022-10-27T19:28:41.7

UVOT Finding Chart