0123456789101114.0

3:39:10.0

06.0

02.0

24:30.0

25:00.0

30.0

-27:26:00.0

27:00.0

28:00.0

RA (J2000)

Dec (J2000)

OBSID 01144538000 / DATE-OBS 2022-12-15T03:57:25.5

UVOT Finding Chart