0246810121406.0

4:41:00.0

54.0

40:48.0

30.0

33:00.0

32:00.0

31:00.0

44:30:00.0

RA (J2000)

Dec (J2000)

OBSID 01150107000 / DATE-OBS 2023-01-21T05:49:29.5

UVOT Finding Chart