0.002

0.004

0.006

0.008

0.01

0.012

0.014

0.016

0.018

0.02

26.0

13:28:20.0

14.0

30.0

42:00.0

41:00.0

46:40:00.0

39:30.0

RA (J2000)

Dec (J2000)

OBSID 01152764000 / DATE-OBS 2023-02-05T10:34:40.3

UVOT Finding Chart