02468101214161820223:23:00.0

56.0

22:52.0

30.0

7:10:00.0

09:00.0

08:00.0

07:30.0

RA (J2000)

Dec (J2000)

OBSID 01153670000 / DATE-OBS 2023-02-10T06:07:09.9

UVOT Finding Chart