051015202556.0

53.0

7:35:50.0

47.0

-8:00:00.0

30.0

01:00.0

02:00.0

RA (J2000)

Dec (J2000)

OBSID 01154815000 / DATE-OBS 2023-02-16T14:50:51.6

UVOT Finding Chart