0102030405008.0

04.0

5:34:00.0

33:56.0

30.0

15:00.0

22:14:00.0

13:00.0

12:30.0

RA (J2000)

Dec (J2000)

OBSID 01159439000 / DATE-OBS 2023-03-11T20:11:21.4

UVOT Finding Chart