0246810121422.0

18.0

14.0

1:06:10.0

06.0

42:00.0

30.0

-47:43:00.0

44:00.0

45:00.0

RA (J2000)

Dec (J2000)

OBSID 01161127000 / DATE-OBS 2023-03-22T21:16:39.6

UVOT Finding Chart