012345640.0

20.0

19:24:00.0

40.0

23:20.0

30.0

02:00.0

01:00.0

80:00:00.0

79:59:30.0

RA (J2000)

Dec (J2000)

OBSID 01162001000 / DATE-OBS 2023-03-28T15:00:45.8

UVOT Finding Chart