05101520253006.0

21:48:00.0

47:54.0

34:00.0

30.0

44:33:00.0

32:00.0

31:00.0

RA (J2000)

Dec (J2000)

OBSID 01167266001 / DATE-OBS 2023-05-06T15:54:14.7

UVOT Finding Chart