0.51.52.538.0

34.0

21:12:30.0

26.0

28:00.0

30.0

34:27:00.0

26:00.0

25:30.0

RA (J2000)

Dec (J2000)

OBSID 01167973000 / DATE-OBS 2023-05-10T12:11:43.9

UVOT Finding Chart