024681012141618202248.0

44.0

22:26:40.0

32:00.0

30.0

31:00.0

8:30:00.0

29:30.0

RA (J2000)

Dec (J2000)

OBSID 01227767000 / DATE-OBS 2024-05-11T18:09:17.1

UVOT Finding Chart