0510152025303524.0

2:14:20.0

16.0

12.0

-21:59:30.0

-22:00:00.0

30.0

01:00.0

02:00.0

RA (J2000)

Dec (J2000)

OBSID 01230423000 / DATE-OBS 2024-05-23T14:58:09.3

UVOT Finding Chart