0246810121436.0

22:21:30.0

24.0

18.0

35:00.0

30.0

51:34:00.0

33:00.0

32:30.0

RA (J2000)

Dec (J2000)

OBSID 01231488000 / DATE-OBS 2024-05-29T03:04:45.3

UVOT Finding Chart