02468101214161834.0

0:48:30.0

26.0

43:30.0

44:00.0

30.0

-19:45:00.0

46:00.0

RA (J2000)

Dec (J2000)

OBSID 01235109000 / DATE-OBS 2024-06-06T03:36:34.0

UVOT Finding Chart