3600

3800

4000

4200

4400

4600

4800

5000

5200

5400

5600

7:50:00.0

49:00.0

48:00.0

47:00.0

36:00.0

38:00.0

40:00.0

42:00.0

44:00.0

46:00.0

-67:50:00.0

52:00.0

54:00.0

RA (J2000)

Dec (J2000)

OBSID 01236151000 / DATE-OBS 2024-06-10T07:38:38.9

UVOT Finding Chart