010203040506070809034.0

8:09:30.0

26.0

22.0

03:00.0

30.0

-37:04:00.0

05:00.0

RA (J2000)

Dec (J2000)

OBSID 01242223000 / DATE-OBS 2024-07-12T03:30:07.2

UVOT Finding Chart