051015202530354014:12:50.0

40.0

30.0

45:00.0

63:44:00.0

43:00.0

RA (J2000)

Dec (J2000)

OBSID 01250282000 / DATE-OBS 2024-08-24T01:06:18.9

UVOT Finding Chart