0510152025303542.0

38.0

34.0

8:18:30.0

26.0

30.0

01:00.0

34:00:00.0

33:59:00.0

58:30.0

RA (J2000)

Dec (J2000)

OBSID 01253910000 / DATE-OBS 2024-09-12T01:49:08.6

UVOT Finding Chart