051015202534.0

10:13:30.0

26.0

22.0

34:00.0

30.0

11:33:00.0

32:00.0

31:00.0

RA (J2000)

Dec (J2000)

OBSID 01259578000 / DATE-OBS 2024-10-10T10:11:06.0

UVOT Finding Chart