30.0

13:36:00.0

-22:00:00.0

05:00.0

10:00.0

15:00.0

RA (J2000)

Dec (J2000)

OBSID 00148522000 / DATE-OBS 2005-08-01T18:29:05.8

UVOT Finding Chart