36.0

8:48:30.0

24.0

41:00.0

30.0

13:40:00.0

39:00.0

38:00.0

RA (J2000)

Dec (J2000)

OBSID 00159994000 / DATE-OBS 2005-10-16T18:29:27.0

UVOT Finding Chart