23:01:48.0

23:01:40.0

32.0

42:00.0

30.0

41:00.0

38:40:00.0

39:00.0

RA (J2000)

Dec (J2000)

OBSID 00163170000 / DATE-OBS 2005-11-09T08:41:03.3

UVOT Finding Chart