14:55:00.0

54:50.0

30.0

21:00.0

51:20:00.0

19:00.0

RA (J2000)

Dec (J2000)

OBSID 00165579000 / DATE-OBS 2005-11-27T14:48:51.7

UVOT Finding Chart