10:53:00.0

30.0

52:00.0

30:00.0

35:00.0

38:40:00.0

45:00.0

RA (J2000)

Dec (J2000)

OBSID 00172767000 / DATE-OBS 2005-12-15T00:41:05.8

UVOT Finding Chart