52.0

46.0

18:50:40.0

30.0

02:00.0

01:00.0

32:00:00.0

31:59:30.0

RA (J2000)

Dec (J2000)

OBSID 00176620000 / DATE-OBS 2006-01-09T16:56:26.7

UVOT Finding Chart