5:39:00.0

38:30.0

20:00.0

25:00.0

-5:30:00.0

35:00.0

RA (J2000)

Dec (J2000)

OBSID 00177533000 / DATE-OBS 2006-01-16T08:43:28.1

UVOT Finding Chart