2:24:00.0

30.0

23:00.0

30:00.0

25:00.0

38:20:00.0

15:00.0

RA (J2000)

Dec (J2000)

OBSID 00179968000 / DATE-OBS 2006-02-02T08:46:50.8

UVOT Finding Chart