6:11:00.0

10:45.0

30.0

11:00.0

70:10:00.0

09:00.0

RA (J2000)

Dec (J2000)

OBSID 00180274000 / DATE-OBS 2006-02-04T20:36:19.7

UVOT Finding Chart