13:32:00.0

31:00.0

10:00.0

05:00.0

35:00:00.0

34:55:00.0

RA (J2000)

Dec (J2000)

OBSID 00180455000 / DATE-OBS 2006-02-06T05:10:45.0

UVOT Finding Chart