40.0

11:45:30.0

20.0

01:00.0

30.0

60:00:00.0

59:00.0

59:58:00.0

RA (J2000)

Dec (J2000)

OBSID 00202035000 / DATE-OBS 2006-03-19T00:59:48.8

UVOT Finding Chart