22:55:00.0

54:00.0

50:00.0

45:00.0

62:40:00.0

35:00.0

RA (J2000)

Dec (J2000)

OBSID 00206257000 / DATE-OBS 2006-04-21T00:40:48.5

UVOT Finding Chart