24:00.0

40.0

20.0

6:23:00.0

-1:00:00.0

05:00.0

10:00.0

15:00.0

RA (J2000)

Dec (J2000)

OBSID 00209351000 / DATE-OBS 2006-05-10T07:46:53.3