20.0

21:32:00.0

40.0

31:20.0

3:00:00.0

55:00.0

2:50:00.0

45:00.0

RA (J2000)

Dec (J2000)

OBSID 00211117000 / DATE-OBS 2006-05-22T02:27:42.6