17:50:00.0

40.0

20.0

49:00.0

-28:00:00.0

05:00.0

10:00.0

15:00.0

RA (J2000)

Dec (J2000)

OBSID 00213190000 / DATE-OBS 2006-06-02T23:57:47.7