38.0

34.0

17:49:30.0

26.0

05:00.0

30.0

-28:06:00.0

07:00.0

08:00.0

RA (J2000)

Dec (J2000)

OBSID 00213190000 / DATE-OBS 2006-06-03T00:09:05.3