40.0

35.0

1:10:30.0

25.0

40:30.0

41:00.0

30.0

-50:42:00.0

43:00.0

RA (J2000)

Dec (J2000)

OBSID 00213486000 / DATE-OBS 2006-06-04T18:22:43.9