45.0

21:23:40.0

35.0

30.0

25.0

-53:00:00.0

01:00.0

02:00.0

03:00.0

RA (J2000)

Dec (J2000)

OBSID 00214805000 / DATE-OBS 2006-06-14T12:47:16.1