12.0

06.0

14:12:00.0

30.0

17:00:00.0

59:00.0

16:58:00.0

57:30.0

RA (J2000)

Dec (J2000)

OBSID 00222154000 / DATE-OBS 2006-08-01T12:30:54.2

UVOT Finding Chart