7:28:56.0

7:28:50.0

7:28:44.0

12:00.0

30.0

13:00.0

-27:14:00.0

15:00.0

RA (J2000)

Dec (J2000)

OBSID 00222546000 / DATE-OBS 2006-08-04T07:30:27.1

UVOT Finding Chart