14:45:28.0

14:45:20.0

14.0

30.0

36:00.0

20:35:00.0

34:00.0

33:30.0

RA (J2000)

Dec (J2000)

OBSID 00224552000 / DATE-OBS 2006-08-14T23:05:25.2

UVOT Finding Chart