30.0

1:13:00.0

12:00.0

11:30.0

55:00.0

55:50:00.0

45:00.0

40:00.0

RA (J2000)

Dec (J2000)

OBSID 00226382000 / DATE-OBS 2006-08-25T03:02:56.6