20.0

3:53:00.0

40.0

52:20.0

35:00.0

-0:40:00.0

45:00.0

50:00.0

RA (J2000)

Dec (J2000)

OBSID 00228006000 / DATE-OBS 2006-09-04T02:32:15.6