42:00.0

30.0

14:41:00.0

40:30.0

50:00.0

45:00.0

48:40:00.0

35:00.0

RA (J2000)

Dec (J2000)

OBSID 00231974000 / DATE-OBS 2006-10-02T01:05:39.4