44.0

9:40:40.0

36.0

32.0

55:30.0

56:00.0

30.0

-21:57:00.0

58:00.0

RA (J2000)

Dec (J2000)

OBSID 00234905000 / DATE-OBS 2006-10-21T15:40:29.5