9:49:00.0

56.0

52.0

48:48.0

-13:10:00.0

30.0

11:00.0

12:00.0

13:00.0

RA (J2000)

Dec (J2000)

OBSID 00239899000 / DATE-OBS 2006-11-21T15:25:17.7