0:31:10.0

06.0

02.0

37:30.0

-29:38:00.0

30.0

39:00.0

RA (J2000)

Dec (J2000)

OBSID 00250908000 / DATE-OBS 2006-12-14T12:31:25.3

UVOT Finding Chart