12.0

06.0

23:53:00.0

30.0

33:00.0

46:32:00.0

31:00.0

30:30.0

RA (J2000)

Dec (J2000)

OBSID 00252588000 / DATE-OBS 2006-12-22T03:32:28.8

UVOT Finding Chart