28.0

24.0

0:07:20.0

38:00.0

30.0

39:00.0

-29:40:00.0

RA (J2000)

Dec (J2000)

OBSID 00282003000 / DATE-OBS 2007-06-11T02:52:11.3

UVOT Finding Chart