2:27:30.0

20.0

30:30.0

31:00.0

30.0

-55:32:00.0

33:00.0

RA (J2000)

Dec (J2000)

OBSID 00286809000 / DATE-OBS 2007-08-02T07:09:48.9

UVOT Finding Chart